Entries 1784 Constant 2.3 ± 70.7 Mean 0.505 ± 0.785 Sigma 0.5 ± 18.3

m] μ [_{loc}xΔ track-to-point

-300 -200 -100 0 100 200 300 entries

0 10 20 30 40 50 60 70 80_{Entries 1784} ± ± ± aligned

not aligned

SPD overlaps